
	Multi-Lingual support in DataBox

DataBox allows all words and phrases inserted during the publishing process to be modified for each of your databases.

By selecting the 'Multi-Lingual Support' option from the 'Publish Menu' you will be presented with a list of all default DataBox reserved words and phrases.

Simply key in the alternative descriptions you would prefer to appear in place of the default value. You may return the default value by pressing the appropriate key marked 'default'.

Provided you tailor the field names of your database (click each field name on the left hand side of the DataBox screen to modify a field label description) in addition to the default words & phrases you may create a DataBox Web Site in any language.

This facility can also be used to provide terminology more appropriate to your database, e.g. "Next Item" rather than "Next Record".

The multi-lingual configuration data is stored in the ".cfg" file associated with each database. This allows the terminology to be tailored individally where multiple databases are supported.


----
For further help, please view the appropriate sections.
If there are any areas not covered sufficiently, or you have comments, please e-mail to documentation@simplewebfx.com.

